CREATE TABLE `HZIMS_VECTOR_PARAM`  (
   `ID` bigint(20) NOT NULL COMMENT '主键ID',
   `NAME` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '名称',
   `URL` varchar(200) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL COMMENT 'URL',
   `PROJECT_PREFIX` varchar(50) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '项目前缀',
   `TABLE_NAME` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '数据库表名',
   `ATTRIBUTE_MAP` varchar(1000) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '向量键值对',
   `TENANT_ID` varchar(12) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '租户ID',
   `STATUS` tinyint(4) NULL DEFAULT NULL COMMENT '状态',
   `CREATE_DEPT` bigint(20) NULL DEFAULT NULL COMMENT '创建单位',
   `CREATE_USER` bigint(20) NULL DEFAULT NULL COMMENT '创建人',
   `CREATE_TIME` datetime(0) NULL DEFAULT NULL COMMENT '创建时间',
   `UPDATE_USER` bigint(20) NULL DEFAULT NULL COMMENT '修改人',
   `UPDATE_TIME` datetime(0) NULL DEFAULT NULL COMMENT '更新时间',
   `IS_DELETED` tinyint(4) NOT NULL COMMENT '是否删除',
   PRIMARY KEY (`ID`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_bin COMMENT = '向量键值对信息' ROW_FORMAT = Dynamic;