update  hzims_oper_maintenance_task set flow_task_name = '待领用' where STATUS =1;
update  hzims_oper_maintenance_task set flow_task_name = '待执行' where STATUS =2;
update  hzims_oper_maintenance_task set flow_task_name = '待确认' where STATUS =3;
update  hzims_oper_maintenance_task set flow_task_name = '待归档' where STATUS =4;
update  hzims_oper_maintenance_task set flow_task_name = '结束' where STATUS =5;