INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1379281147378315265, 0, 'EM_MODEL_TYPE', '-1', '模板类型', 1, '', 0, 1, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1379281706982354945, 0, 'EM_MODEL_TYPE', '-1', '模板类型', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1379281813949689857, 1379281706982354945, 'EM_MODEL_TYPE', '1', '模板类型一', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1379281872602836993, 1379281706982354945, 'EM_MODEL_TYPE', '2', '模板类型二', 2, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1402533771560910850, 0, 'FDP_FAULT_DETECTABILITY', '-1', '故障检测难易程度', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1402533860534681602, 1402533771560910850, 'FDP_FAULT_DETECTABILITY', '1', '易', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1402533893644517378, 1402533771560910850, 'FDP_FAULT_DETECTABILITY', '2', '中', 2, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1402533929371598850, 1402533771560910850, 'FDP_FAULT_DETECTABILITY', '3', '难', 3, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1463031084514267137, 0, 'FDP_TASK_TYPE', '-1', '智能诊断任务类型', 3, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1463031405428854785, 1463031084514267137, 'FDP_TASK_TYPE', '1', '手动', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1463031450081415169, 1463031084514267137, 'FDP_TASK_TYPE', '2', '自动', 2, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1619897172690534402, 0, 'FDP_MONITOR_BINDING_STATUS', '-1', '监测点绑定状态', 4, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1619897279343296514, 1619897172690534402, 'FDP_MONITOR_BINDING_STATUS', '1', '绑定成功', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1619897321756098562, 1619897172690534402, 'FDP_MONITOR_BINDING_STATUS', '2', '绑定失败', 2, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1619897388072239105, 1619897172690534402, 'FDP_MONITOR_BINDING_STATUS', '3', '未绑定', 3, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1633016108671905794, 0, 'DEVICETYPE', '-1', '设备类型', 10, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1633016255816478722, 1633016108671905794, 'DEVICETYPE', '1', '公用', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1633016338171637761, 1633016108671905794, 'DEVICETYPE', '2', '机组', 2, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1638000391480205313, 1633016338171637761, 'DEVICETYPE', '3', '立式机组', 1, '', 0, 1, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1638000491426275330, 1633016338171637761, 'DEVICETYPE', '4', '卧式机组', 2, '', 0, 1, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1638000590814502914, 1633016338171637761, 'DEVICETYPE', '5', '灯泡贯流式', 3, '', 0, 1, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1638020338327543810, 1633016108671905794, 'DEVICETYPE', '3', '其他', 3, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1638020560906674177, 0, 'SETTYPE', '-1', '机组类型', 7, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1638020669019054082, 1638020560906674177, 'SETTYPE', '1', '立式机组', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1638020767178350594, 1638020560906674177, 'SETTYPE', '2', '卧式机组', 2, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1638020840851300353, 1638020560906674177, 'SETTYPE', '3', '其他', 3, '', 0, 1, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1645258692320387074, 1638020560906674177, 'SETTYPE', '3', '灯泡贯流式机组', 3, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1645258829365075970, 1638020560906674177, 'SETTYPE', '4', '其他', 4, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1675697704419729410, 0, 'DEVICE_MACHINE_TYPE', '-1', '设备机组类型', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1675699613977288706, 1675697704419729410, 'DEVICE_MACHINE_TYPE', '0', '低压机组', 1, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
INSERT INTO `BLADEX`.`BLADE_DICT` (`ID`, `PARENT_ID`, `CODE`, `DICT_KEY`, `DICT_VALUE`, `SORT`, `REMARK`, `IS_SEALED`, `IS_DELETED`, `DICT_TYPE`, `APP_ID`, `APP_CODE`) VALUES (1675699674580787201, 1675697704419729410, 'DEVICE_MACHINE_TYPE', '1', '高压机组', 2, '', 0, 0, 0, -1, 'HZIMS-EQUIPMENT');
