CREATE TABLE IF NOT EXISTS `HZIMS_OPER_CONSTRUCTION`  (
    `ID` BIGINT(20) NOT NULL COMMENT '主键ID',
    `CODE` VARCHAR(255) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '施工编号',
    `CONSTRUCTION_TIME` DATETIME NULL DEFAULT NULL COMMENT '施工时间',
    `OVERHAUL_NAME` VARCHAR(255) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '检修名称',
    `CONSTRUCTION_LOCATION` VARCHAR(1024) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '施工地点',
    `OVERHAUL_HEAD` BIGINT(20) NULL DEFAULT NULL COMMENT '检修负责人',
    `OVERHAUL_HEAD_NAME` VARCHAR(255) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '检修负责人名称',
    `OVERHAUL_PERSONNEL` VARCHAR(255) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '检修人员: 根据“，”分割',
    `OVERHAUL_PERSONNEL_NAME` VARCHAR(255) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '检修人员名称: 根据“，”分割',
    `OVERHAUL_TIME` DATETIME NULL DEFAULT NULL COMMENT '检修时间',
    `COMPLETE_WORK_DESC` VARCHAR(2048) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NOT NULL COMMENT '今日完成任务描述',
    `PLAN_WORK_DESC` VARCHAR(2048) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '明日工作计划描述',
    `CONSTRUCTION_IMG` VARCHAR(512) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '施工图片: 根据“，”分割',
    `CONSTRUCTION_ATTACHMENT` VARCHAR(512) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '施工附件',
    `RECORDER` BIGINT(20) NULL DEFAULT NULL COMMENT '记录人',
    `RECORDER_NAME` VARCHAR(255) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '记录人名称',
    `REVIEWER` BIGINT(20) NULL DEFAULT NULL COMMENT '审核人',
    `REVIEWER_NAME` VARCHAR(255) CHARACTER SET UTF8MB4 COLLATE UTF8MB4_GENERAL_CI NULL DEFAULT NULL COMMENT '审核人名称',
    `TENANT_ID` VARCHAR(12) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '租户ID',
    `STATUS` TINYINT(4) NULL DEFAULT 0 COMMENT '业务状态',
    `CREATE_DEPT` BIGINT(20) NULL DEFAULT NULL COMMENT '创建单位',
    `IS_DELETED` TINYINT(4) NOT NULL DEFAULT 0 COMMENT '是否删除',
    `CREATE_USER` BIGINT(20) NULL DEFAULT NULL COMMENT '创建人',
    `CREATE_TIME` DATETIME NOT NULL COMMENT '创建时间',
    `UPDATE_USER` BIGINT(20) NULL DEFAULT NULL COMMENT '修改人',
    `UPDATE_TIME` DATETIME NULL DEFAULT NULL COMMENT '修改时间',
    PRIMARY KEY (`ID`) USING BTREE
) ENGINE = INNODB CHARACTER SET = UTF8MB4 COLLATE = UTF8MB4_GENERAL_CI ROW_FORMAT = DYNAMIC;

ALTER TABLE `HZIMS_OPER_ACCESS_CONTENT` ADD COLUMN `STATION_CODE` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL AFTER `TICKET_TEMPLATE_ID`;

ALTER TABLE `HZIMS_OPER_ACCESS_CONTENT` ADD COLUMN `STATION_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL AFTER `STATION_CODE`;

ALTER TABLE `HZIMS_OPER_ACCESS_CONTENT` ADD COLUMN `EM_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL AFTER `STATION_NAME`;

ALTER TABLE `HZIMS_OPER_ACCESS_CONTENT` MODIFY COLUMN `EM_CODE` VARCHAR(64) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT '' COMMENT '设备编码' AFTER `PLAN_ID`;

ALTER TABLE `HZIMS_OPER_ACCESS_LIBRARY` ADD COLUMN `EM_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '设备名称' AFTER `EM_CODE`;

ALTER TABLE `HZIMS_OPER_ACCESS_LIBRARY` MODIFY COLUMN `EM_CODE` VARCHAR(64) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '设备编码' AFTER `ID`;

ALTER TABLE `HZIMS_OPER_ACCESS_LIBRARY` MODIFY COLUMN `PERIOD` INT(11) NULL DEFAULT NULL COMMENT '检修间隔' AFTER `GRADE_CODE`;

ALTER TABLE `HZIMS_OPER_ACCESS_LIBRARY` MODIFY COLUMN `WORK_STANDARDS` VARCHAR(500) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT '' COMMENT '操作规范' AFTER `PERIOD`;

ALTER TABLE `HZIMS_OPER_ACCESS_LIBRARY` MODIFY COLUMN `SAFE_INFOS` VARCHAR(500) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT '' COMMENT '安全警告' AFTER `WORK_STANDARDS`;

ALTER TABLE `HZIMS_OPER_ACCESS_LIBRARY` MODIFY COLUMN `STOP_HOURS` INT(11) NULL DEFAULT NULL COMMENT '停用时间' AFTER `SAFE_INFOS`;

ALTER TABLE `HZIMS_OPER_ACCESS_LIBRARY` MODIFY COLUMN `DESCRIPITON` VARCHAR(500) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT '' COMMENT '描述' AFTER `LAST_SERVICE_TIME`;

ALTER TABLE `HZIMS_OPER_ACCESS_PLAN` ADD COLUMN `UPDATE_USER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '修改人名称' AFTER `NEXT_STEP_OPERATOR`;

ALTER TABLE `HZIMS_OPER_ACCESS_PLAN` ADD COLUMN `CREATE_USER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '创建人名称' AFTER `UPDATE_USER_NAME`;

ALTER TABLE `HZIMS_OPER_ACCESS_PLAN` ADD COLUMN `MANAGER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL AFTER `CREATE_USER_NAME`;

ALTER TABLE `HZIMS_OPER_ACCESS_PLAN` ADD COLUMN `TECH_LEAD_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL AFTER `MANAGER_NAME`;

ALTER TABLE `HZIMS_OPER_ACCESS_STATISTICS` ADD COLUMN `EM_CODE` VARCHAR(64) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '设备编号' AFTER `TASK_ID`;

ALTER TABLE `HZIMS_OPER_ACCESS_STATISTICS` ADD COLUMN `PLAN_HOURS` INT(11) NULL DEFAULT NULL COMMENT '计划工时' AFTER `PLAN_END_TIME`;

ALTER TABLE `HZIMS_OPER_ACCESS_STATISTICS` ADD COLUMN `UPDATE_USER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '修改人名称' AFTER `UPDATE_TIME`;

ALTER TABLE `HZIMS_OPER_ACCESS_STATISTICS` ADD COLUMN `CREATE_USER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '创建人名称' AFTER `UPDATE_USER_NAME`;

ALTER TABLE `HZIMS_OPER_ACCESS_STATISTICS` ADD COLUMN `MANAGER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '负责人名称' AFTER `CREATE_USER_NAME`;

ALTER TABLE `HZIMS_OPER_ACCESS_STATISTICS` ADD COLUMN `EM_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '设备名称' AFTER `MANAGER_NAME`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK` ADD COLUMN `STATION_CODE` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '站点编码' AFTER `ID`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK` ADD COLUMN `STATION_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '站点名称' AFTER `STATION_CODE`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK` ADD COLUMN `EM_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '设备名称' AFTER `EM_CODE`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK` ADD COLUMN `PLAN_HOURS` INT(11) NULL DEFAULT NULL COMMENT '计划工时' AFTER `PLAN_END_TIME`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK` ADD COLUMN `CONSTRUCTION_ID` BIGINT(20) NULL DEFAULT NULL COMMENT '施工日志ID' AFTER `NEXT_STEP_OPERATOR`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK` ADD COLUMN `UPDATE_USER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '修改人名称' AFTER `CONSTRUCTION_ID`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK` ADD COLUMN `CREATE_USER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '创建人名称' AFTER `UPDATE_USER_NAME`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK` ADD COLUMN `HANDLER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL AFTER `CREATE_USER_NAME`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK_DETAIL` ADD COLUMN `UPDATE_USER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '修改人名称' AFTER `UPDATE_TIME`;

ALTER TABLE `HZIMS_OPER_ACCESS_TASK_DETAIL` ADD COLUMN `CREATE_USER_NAME` VARCHAR(255) CHARACTER SET UTF8 COLLATE UTF8_GENERAL_CI NULL DEFAULT NULL COMMENT '创建人名称' AFTER `UPDATE_USER_NAME`;