ALTER TABLE `hzims-ticket`.`hzims_standard_ticket_info` ADD COLUMN `create_user_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '创建人姓名' AFTER `class_group_name`;

ALTER TABLE `hzims-ticket`.`hzims_standard_ticket_info` ADD COLUMN `update_user_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '修改人姓名' AFTER `create_user_name`;

ALTER TABLE `hzims-ticket`.`hzims_standard_ticket_info` ADD COLUMN `issue_order_person_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '发令人名称' AFTER `update_user_name`;

ALTER TABLE `hzims-ticket`.`hzims_standard_ticket_info` ADD COLUMN `access_order_person_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '受令人名称' AFTER `issue_order_person_name`;

ALTER TABLE `hzims-ticket`.`hzims_standard_ticket_info` ADD COLUMN `guardian_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '许可人名称' AFTER `access_order_person_name`;

ALTER TABLE `hzims-ticket`.`hzims_standard_ticket_info` ADD COLUMN `principal_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '负责人名称' AFTER `guardian_name`;


ALTER TABLE `hzims-ticket`.`hzims_work_ticket_finish` ADD COLUMN `end_principal_name` varchar(100) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '工作终结负责人' AFTER `other_items`;

ALTER TABLE `hzims-ticket`.`hzims_work_ticket_finish` ADD COLUMN `end_licensor_name` varchar(100) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '工作终结许可人' AFTER `end_principal_name`;

ALTER TABLE `hzims-ticket`.`hzims_work_ticket_finish` ADD COLUMN `finish_licensor_name` varchar(100) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '工作票终结许可人' AFTER `end_licensor_name`;

ALTER TABLE `hzims-ticket`.`hzims_work_ticket_info` ADD COLUMN `is_offline` tinyint(2) NULL DEFAULT 0 COMMENT '是否线下 ： 1-线下，0-线上' AFTER `is_start`;

ALTER TABLE `hzims-ticket`.`hzims_work_ticket_info` ADD COLUMN `signer_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '签发人名称' AFTER `is_offline`;

ALTER TABLE `hzims-ticket`.`hzims_work_ticket_info` ADD COLUMN `licensor_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '许可人名称' AFTER `signer_name`;

ALTER TABLE `hzims-ticket`.`hzims_work_ticket_info` ADD COLUMN `watch_principal_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '值班负责人名称' AFTER `licensor_name`;

ALTER TABLE `hzims-ticket`.`hzims_work_ticket_info` ADD COLUMN `implement_status` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '执行状态字段：0未执行，1为执行（运行人员确认过）' AFTER `watch_principal_name`;

ALTER TABLE `hzims-ticket`.`hzims_work_ticket_info` ADD COLUMN `update_user_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '修改人名称' AFTER `implement_status`;

ALTER TABLE `hzims-ticket`.`hzims_work_ticket_info` ADD COLUMN `create_user_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '创建人名称' AFTER `update_user_name`;

